/*
Navicat MySQL Data Transfer

Source Server         : localhost
Source Server Version : 50624
Source Host           : localhost:3306
Source Database       : tornado_db

Target Server Type    : MYSQL
Target Server Version : 50624
File Encoding         : 65001

Date: 2025-03-10 16:41:08
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for `caches`
-- ----------------------------
DROP TABLE IF EXISTS `caches`;
CREATE TABLE `caches` (
  `key` varchar(255) NOT NULL,
  `value` longtext,
  PRIMARY KEY (`key`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

-- ----------------------------
-- Records of caches
-- ----------------------------
